ALTER TABLE osint.event_exhibits
  ALTER COLUMN occurred_at DROP NOT NULL;

COMMENT ON COLUMN osint.event_exhibits.occurred_at IS 'Optional reconstructed occurrence time; never inferred from exhibit creation time';
