UPDATE osint.exhibits AS exhibit
SET width = 220,
    height = 272,
    updated_at = NOW()
FROM osint.document_exhibits AS document
WHERE document.exhibit_id = exhibit.id
  AND document.capture_kind_id = 'clipping'
  AND exhibit.width = 210
  AND exhibit.height = 194;
