UPDATE osint.exhibits AS exhibit
SET width = 230,
    height = 290,
    updated_at = NOW()
FROM osint.document_exhibits AS document
WHERE document.exhibit_id = exhibit.id
  AND document.capture_kind_id = 'clipping'
  AND (exhibit.width <> 230 OR exhibit.height <> 290);
